ক্যাগ রিপোর্ট সিদ্ধান্তমূলক নয়, জানাল সুপ্রিম কোর্ট

নয়াদিল্লি: সিএজি (CAG) বা ক্যাগ রিপোর্টকে সিদ্ধান্তমূলক হিসাবে গ্রহণ করা যাবে না। সুপ্রিম কোর্ট (Supreme Court) কর্ণাটক ইএমটিএ কোল মাইনস লিমিটেডের বিরুদ্ধে দুর্নীতির (Corruption) অভিযোগ বাতিল করেছে। সর্বোচ্চ আদালত সূত্রের খবর, কম্পট্রোলার অ্যান্ড অডিটর জেনারেলের (সিএজি) রিপোর্টগুলি সংসদ দ্বারা যাচাই-বাছাই সাপেক্ষে। সরকার সর্বদা উল্লিখিত প্রতিবেদনে তার মতামত দিতে পারে। বেসরকারি সংস্থার বিরুদ্ধে অবৈধ কয়লা বন্টনের সুবিধা দেওয়ার অভিযোগ রয়েছে। শুক্রবার সুপ্রিম কোর্ট বলেছে, সিবিআই একটি সিএজি রিপোর্টের উপর ভিত্তি করে একটি ‘ফিশিং তদন্ত’ শুরু করেছে। যা সংসদীয় অনুমোদন পায়নি।

সুপ্রিম কোর্টের বক্তব্য, সিবিআই – সিএজি-র অডিট রিপোর্টের শক্তিতে মাছ ধরার তদন্ত শুরু করেছে এবং তারপরে আবেদনকারীদের বিরুদ্ধে অপরাধমূলক অভিপ্রায় খুঁজে বের করার জন্য পিছনের দিকে কাজ শুরু করে। বিচারপতি হিমা কোহলি ও বিচারপতি আহসানউদ্দিন আমানুল্লাহর বেঞ্চ এমনই জানায়।

আরও পড়ুন: বাংলাদেশে বন্যা রুখতে ভারতের দ্বারস্থ ইউনুস, কী হবে হাসিনার?

আদালত বলেছে, ক্যাগের রিপোর্টগুলি রাষ্ট্রপতির কাছে জমা দিতে হবে।  সংসদের প্রতিটি হাউসের সামনে পেশ করতে হবে তা। রাজ্যগুলির ক্ষেত্রে যে  রিপোর্টগুলি রাজ্যপালের কাছে জমা দেওয়া হয়, সেগুলিকে রাজ্যের আইনসভার সামনে উপস্থাপন করা হবে।

আরও খবর দেখুন